
\documentclass[ en ]{ptb-confirm}

\missingEntries{ 0 }

\handledby{Dr. Karl Jousten}
\myref{7.5-1V-15-05}
%%%\mymail{2015-05-14}
\myphone{7216}
\myfax{7490}
\myemail{Karl.Jousten@ptb.de}

\yourref{4711-0815}
\yourmail{2015-05-08}
\KindOfEnquiry{email}
\DateOfEnquiry{}% wenn leer, dann identisch zu \DateOfApplication

\Company{EDWARDS LTD}
\Name{Peter Smith}
\Street{15 Marshall Road}
\Zipcode{BN22 9BA}
\Town{Eastbourne, East Sussex}
\Land{United Kingdom}

\Device{CDG 1\,Torr XXX YYY ZZZ XXX YYY ZZZ XXX YYY ZZZ XXX YYY ZZZ XXX YYY ZZZ
  XXX YYY ZZZ XXX YYY ZZZ XXX YYY ZZZ }
\Condition{Moonlight}
\ScheduleDate{2015-07-13}
\Duration{17}
\Fee{1789.98}

\ConstantText{%
Your order will be settled with a separate invoice that uses
fixed calibration fees according to the decree of the Ministry of Commerce of
Germany. If the working time for your device~/ devices will exceed more than
25\,\% of the working time used for the determination of the fee, the actual
costs have to be charged.
\par
The procedure of PTB keeps to German laws. General terms of business of the
customer cannot be accepted.
\par
Please, consider that for safety reasons and for protection of our primary
standards, we cannot start a calibration before we have not received the
enclosed declaration. 
}

\date{2017-07-18}%{{DB}} 

\begin{document}
\end{document}
